130 150 170

0.0 0.05 0.10 0.15

Marathon record time

Density

(a) 10 nearest neighbors

130 150 170

0.0 0.04 0.10

Marathon record time

Density

(b) 20 nearest neighbors

130 150 170

0.0 0.04 0.08 0.12

Marathon record time

Density

(c) 30 nearest neighbors

130 150 170

0.02 0.06

Marathon record time

Density

(d) 40 nearest neighbors